\section{(A complicated region of absolute stability)}
See attached figure for a plot of the region of absolute stability.  Notice, the region of absolute stability is not the entire left half plane.  Hence the method is not unconditionally stable.  The method is restricted to specific values of $\kappa$ i.e pruduct of $\lambda$ and $h$.  Hence we will have to restrict ourself to small step sizes to get stability. 