\documentclass[11pt]{article}
\usepackage{amssymb,amsmath,amsfonts}
\usepackage[dvips]{graphicx}

\author{Greg Nelson, Jeremy Morris and Anup Bhawalkar}
\title{Homework 2}

\begin{document}
\maketitle

\input{p01}

\input{p02}

\input{p03}

\input{p04}

\input{p05}

\input{p06}

\input{p07}

\input{p08}

\input{p09}

\input{p10}

\end{document}
