

\begin{longtable}{|l|r|r|r|r|r|r|}\hline
   Parameter &    DF &    Estimate &    Standard Error &    t~Value &    Pr~>~|t| &    Parameter Estimate from Coded Data\\\hline
\endhead
   Intercept &    1 &    286220 &    359301 &    0.80 &    0.4297 &    5.090857\\\hline
   Year &    1 &    $-$290.222429 &    364.772859 &    $-$0.80 &    0.4303 &    $-$0.702000\\\hline
   Year*Year &    1 &    0.073571 &    0.092582 &    0.79 &    0.4308 &    0.294286\\\hline
\end{longtable}

