%\documentstyle[12pt,amssymbols]{book}
\documentstyle[12pt]{article}
\oddsidemargin 0in  %0.5in
\topmargin     0in
\textheight    9in
\textwidth     6.in %6in
\headheight    0in
\headsep       0in
\footskip      0.5in
\footheight    0in
\pagestyle{empty}
\renewcommand{\baselinestretch}{1.5}
\def\beq{\begin{equation}}
\def\eeq{\end{equation}}
\def\inprod#1#2{\langle#1,#2\rangle}
\def\norm#1{||#1||}%
\def\bea{\begin{eqnarray}}
\def\ena{\end{eqnarray}}
\def\bmath{\begin{displaymath}}
\def\emath{\end{displaymath}}
\def\Re{{\rm Re\ }}
\def\QED{\nopagebreak \hfill \vrule width 4pt height 4pt depth 4pt \medskip}
\def\sinc{{\rm ~sinc}}
\def\s{\sigma}
\def\d{\delta}

\begin{document}
\section*{Errata for ``Mathematical Physiology'' - Second Edition}
Remark:  Following is a list of known errors in the 2nd edition of Mathematical Physiology.

\begin{itemize}
\item pg. 177, Figure 2, the arrow beside $I_t dx$ is pointed in the wrong direction.
\item pg. 189, eqns 4.64, 4.66  have strange extra symbols  $[6bp]$ at the beginning

\item pg. 334, line 11, $w$, not $\omega$

\item pg. 626, exercise 24   reference should be (12.189-12.190) 

\item pg. 689, line -10, Exercise 13.13a

\item pg.843, eqn 17.60 is wrong and as a result so are 17.63 and 17.64.

\item pg. 913 Table 19.2, $K_{C}$ should be $K_{Ca}$.  Add $g_{dark} = 2\mu$M.  In addition, some of the constants in the table are too large, but we aren't sure yet exactly which ones.  Stay tuned.

\item pg. 953, eqns 20.32-20.34 are wrong. they should read

Multiplying by $\cos(m\pi x)$, and integrating from 0 to 1 we find

\beq
\sum_{n=0}^\infty \alpha_{mn}A_n = f_m
\eeq
where
\beq
\alpha_{mn} = - \frac{1}{2} n\pi  \sinh(n\pi{\s})\delta_{nm} +\int_0^1{2\over Z(x)}\left[  \cosh(n\pi{\s})\cos(n\pi x)\cos(m\pi x) dx\right]
\eeq
and 
\beq
f_m = {\s}\d_{m0} - \int_0^1 {x(2-x)\cos(m\pi x)
\over Z(x)}\,dx.
\eeq

\end{itemize}
\end{document}